en	Bookmark camera position {0}

en	Go to camera bookmark {0}

en	Camera bookmark added! To return here at any moment, press {0}

en	To bookmark current position, press {0}

en	You can create up to 10 camera bookmarks for easy navigation. Bookmark a camera position using {0}, {1}, etc., and then quickly revisit your saved views by pressing {2}, {3}, etc.